\begingroup
\clearpage% Manually insert \clearpage
\let\clearpage\relax% Remove \clearpage functionality
\vspace*{-16pt}% Insert needed vertical retraction
\chapter[RESULTS]{RESULTS}
\endgroup


\section{Configuration One}
\section{Configuration Two}