\providecommand{\bysame}{\leavevmode\hbox to3em{\hrulefill}\thinspace}
\providecommand{\MR}{\relax\ifhmode\unskip\space\fi MR }
% \MRhref is called by the amsart/book/proc definition of \MR.
\providecommand{\MRhref}[2]{%
  \href{http://www.ams.org/mathscinet-getitem?mr=#1}{#2}
}
\providecommand{\href}[2]{#2}
\begin{thebibliography}{10}
\interlinepenalty=10000

\bibitem{tp100technical}
PBS Aerospace, \emph{Basic technical information turboprop engine tp100}, April 2015.

\bibitem{doi:10.2514/6.2018-4984}
Cheryl~L. Bowman, Ty~V. Marien, and James~L. Felder, \emph{Turbo- and hybrid-electrified aircraft propulsion for commercial transport}, 2018.

\bibitem{TurboelectricAS}
Johnathan Burgess, Timothy Runnels, Joshua Johnsen, Joshua Drake, and Kurt Rouser, \emph{Experimental comparison of direct and active throttle control of a 7 kw turboelectric power system for unmanned aircraft}, Applied Sciences \textbf{11} (2021), no.~22.

\bibitem{faa_engines}
FAA, \emph{Aircraft engines}, Federal Aviation Administration, 2024.

\bibitem{nasa_prop_overview}
Ralph Jansen, \emph{Overview of nasa electrified aircraft propulsion activities}, NASA Glenn Research Center, 2017.

\bibitem{CessnaASME}
Joshua Johnsen, Joshua Melvin, Joshua Drake, Muwanika Jdiobe, and Kurt Rouser, \emph{Experimental evaluation of an electric powertrain designed for a 180-kw turboelectric aircraft ground test rig}, Journal of Engineering for Gas Turbines and Power \textbf{146} (2024).

\bibitem{EoPGTR2}
Jack Mattingly and Hans von Obain, \emph{Elements of propulsion: Gas turbines and rockets 2nd edition}, AIAA, 2016.

\bibitem{MelvinThesis}
Joshua Melvin, \emph{Integration and evaluation of a 180-kw turboprop engine with a turboelectric ground test rig}, Master's thesis, OKLAHOMA STATE UNIVERSITY, May 2021.

\bibitem{nasa_turbojet}
NASA, \emph{Turbojet engine}, NASA Glenn Research Center, 2017.

\bibitem{hybrid_trends}
Manuel Rendón, Carlos Sánchez, Josselyn Gallo~Muñoz, and Alexandre Anzai, \emph{Aircraft hybrid-electric propulsion: Development trends, challenges and opportunities (https://rdcu.be/cmg4u)}, Sba Controle \& Automação Sociedade Brasileira de Automatica (2021).

\end{thebibliography}
