From f97f266c8502a03b483b62ba1fea390923127133 Mon Sep 17 00:00:00 2001
From: Joshua Drake <joshua.ellis.drake@gmail.com>
Date: Fri, 25 Oct 2024 12:00:22 -0500
Subject: Everything seems to be working again...

---
 dissertation_main.bbl | 53 +++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 53 insertions(+)
 create mode 100644 dissertation_main.bbl

(limited to 'dissertation_main.bbl')

diff --git a/dissertation_main.bbl b/dissertation_main.bbl
new file mode 100644
index 0000000..8cdfd83
--- /dev/null
+++ b/dissertation_main.bbl
@@ -0,0 +1,53 @@
+\providecommand{\bysame}{\leavevmode\hbox to3em{\hrulefill}\thinspace}
+\providecommand{\MR}{\relax\ifhmode\unskip\space\fi MR }
+% \MRhref is called by the amsart/book/proc definition of \MR.
+\providecommand{\MRhref}[2]{%
+  \href{http://www.ams.org/mathscinet-getitem?mr=#1}{#2}
+}
+\providecommand{\href}[2]{#2}
+\begin{thebibliography}{1}
+\interlinepenalty=10000
+
+\bibitem{tp100technical}
+PBS Aerospace, \emph{Basic technical information turboprop engine tp100}, April
+  2015.
+
+\bibitem{doi:10.2514/6.2018-4984}
+Cheryl~L. Bowman, Ty~V. Marien, and James~L. Felder, \emph{Turbo- and
+  hybrid-electrified aircraft propulsion for commercial transport}, 2018.
+
+\bibitem{TurboelectricAS}
+Johnathan Burgess, Timothy Runnels, Joshua Johnsen, Joshua Drake, and Kurt
+  Rouser, \emph{Experimental comparison of direct and active throttle control
+  of a 7 kw turboelectric power system for unmanned aircraft}, Applied Sciences
+  \textbf{11} (2021), no.~22.
+
+\bibitem{nasa_prop_overview}
+Ralph Jansen, \emph{Overview of nasa electrified aircraft propulsion
+  activities}, NASA Glenn Research Center, 2017.
+
+\bibitem{CessnaASME}
+Joshua Johnsen, Joshua Melvin, Joshua Drake, Muwanika Jdiobe, and Kurt Rouser,
+  \emph{Experimental evaluation of an electric powertrain designed for a 180-kw
+  turboelectric aircraft ground test rig}, Journal of Engineering for Gas
+  Turbines and Power \textbf{146} (2024).
+
+\bibitem{EoPGTR2}
+Jack Mattingly and Hans von Obain, \emph{Elements of propulsion: Gas turbines
+  and rockets 2nd edition}, AIAA, 2016.
+
+\bibitem{MelvinThesis}
+Joshua Melvin, \emph{Integration and evaluation of a 180-kw turboprop engine
+  with a turboelectric ground test rig}, Master's thesis, OKLAHOMA STATE
+  UNIVERSITY, May 2021.
+
+\bibitem{nasa_turbojet}
+NASA, \emph{Turbojet engine}, NASA Glenn Research Center, 2017.
+
+\bibitem{hybrid_trends}
+Manuel Rendón, Carlos Sánchez, Josselyn Gallo~Muñoz, and Alexandre Anzai,
+  \emph{Aircraft hybrid-electric propulsion: Development trends, challenges and
+  opportunities (https://rdcu.be/cmg4u)}, Sba Controle \& Automação Sociedade
+  Brasileira de Automatica (2021).
+
+\end{thebibliography}
-- 
cgit v1.2.3

